\begin{thebibliography}{10}

\bibitem{mai00}
Maihara, T., Ohta, K., Tamura, N., Ohtani, H., and et~al., M.~A., ``Fiber
  multi-object spectrograph (fmos) for the subaru telescope,'' in [{\em Optical
  and IR instrumentation and detectors}{\nolinebreak\hspace{0.1em}]},  Iye, M.
  and Moorwood, A., eds., {\em Proc. SPIE} {\bf 4008},  1111--1118 (2000).

\bibitem{kim03}
Kimura, M., Maihara, T., Ohta, K., and et~al., F.~I., ``Fibre-multi-object
  spectrograph (fmos) for subaru telescope,'' in [{\em Instrument Design and
  Performance for Optical/Infrared Ground-based
  Telescopes}{\nolinebreak\hspace{0.1em}]},  Iye, M. and Moorwood, A., eds.,
  {\em Proc. SPIE} {\bf 4841},  974--984 (2003).

\bibitem{gil00}
Gilligham, P., Miziarsky, S., Akiyama, M., and V.Klocke, ``Echidna - a
  multi-fiber positioner for the subaru telescope,'' in [{\em Optical and IR
  instrumentation and detectors}{\nolinebreak\hspace{0.1em}]},  Iye, M. and
  Moorwood, A., eds., {\em Proc. SPIE} {\bf 4008},  1395--1403 (2000).

\bibitem{moo03}
Moore, A., Gillingham, P., Griesbach, J., and Akiyama, M., ``Spine development
  for the echidna fiber positioner,'' in [{\em Instrument Design and
  Performance for Optical/Infrared Ground-based
  Telescopes}{\nolinebreak\hspace{0.1em}]},  Iye, M. and Moorwood, A., eds.,
  {\em Proc. SPIE} {\bf 4841},  142901439 (2003).

\bibitem{gil03}
Gilligham, P., Moore, A., and et~al., M.~A., ``The fibre multi-object
  spectrograph (fmos) project: the anglo-australian observatory role,'' in
  [{\em Instrument Design and Performance for Optical/Infrared Ground-based
  Telescopes}{\nolinebreak\hspace{0.1em}]},  Iye, M. and Moorwood, A., eds.,
  {\em Proc. SPIE} {\bf 4841},  985--996 (2003).

\bibitem{brz04}
Brzeski, J., Gillingham, P., and et~al., D.~C., ``Echidna - the engineering
  challenges,'' in [{\em Ground-based Instrumentation for
  Astronomy}{\nolinebreak\hspace{0.1em}]},  Moorwood, A. and Iye, M., eds.,
  {\em Proc. SPIE} {\bf 5492},  1228--1242 (2004).

\bibitem{eto04}
Eto, S., Maihara, T., and et~al., K.~O., ``The fiber multi-object spectrograph
  (fmos) for the subaru telescope iii,'' in [{\em Ground-based Instrumentation
  for Astronomy}{\nolinebreak\hspace{0.1em}]},  Moorwood, A. and Iye, M., eds.,
  {\em Proc. SPIE} {\bf 5492},  1314--1318 (2004).

\bibitem{iwa06}
Iwamuro, F., Maihara, T., Ohta, K., Eto, S., Sakai, M., and et~al., M.~A.,
  ``Fmos - the fiber multiple-object spectrograph iv: current status of
  ohs-based spectrograph,'' in [{\em Ground-based and Airborne Instrumentation
  for Astronomy}{\nolinebreak\hspace{0.1em}]},  McLean, I. and Iye, M., eds.,
  {\em Proc. SPIE} {\bf 6269},  431 (2006).

\bibitem{lew03}
Lewis, I., Dalton, G., and et~al., A.~H., ``Developments on the uk fmos project
  for the subaru telescope,'' in [{\em Instrument Design and Performance for
  Optical/Infrared Ground-based Telescopes}{\nolinebreak\hspace{0.1em}]},  Iye,
  M. and Moorwood, A., eds., {\em Proc. SPIE} {\bf 4841},  1108--1114 (2003).

\bibitem{dal06}
Dalton, G., Lewis, I., and et~al., D.~B., ``The uk fmos spectrograph,'' in
  [{\em Ground-based and Airborne Instrumentation for
  Astronomy}{\nolinebreak\hspace{0.1em}]},  McLean, I. and Iye, M., eds., {\em
  Proc. SPIE} {\bf 6269},  136 (2006).

\bibitem{gra03}
Murry, G., Woodhouse, G., and et~al., T.~F., ``An ultraprecision fiber
  connector for fmos,'' in [{\em iber-based Component Fabrication, Testing, and
  Connectorization}{\nolinebreak\hspace{0.1em}]},  Pruneri, V., Dahlgren, R.,
  and Gregory, M., eds., {\em Proc. SPIE} {\bf 4943},  184--194 (2003).

\bibitem{gra04}
Murry, G., Luke, P., Robertson, D., and Tamura, N., ``A connectorized fiber
  downlink for fmos,'' {\em Proc. SPIE} {\bf 5492},  1383--1394 (2004).

\bibitem{kim06}
Kimura, M., Maihara, T., Iwamuro, F., Eto, S., and et~al., M.~A., ``Fmos: The
  fiber multi-object spectrograph v results of early pir engineering run,'' in
  [{\em Ground-based and Airborne Instrumentation for
  Astronomy}{\nolinebreak\hspace{0.1em}]},  McLean, I. and Iye, M., eds., {\em
  Proc. SPIE} {\bf 6269},  132 (2006).

\bibitem{zac04}
Zacharias, N., Urban, S., Zacharias, M., Wycoff, G., Hall, D., Monet, D., and
  Rafferty, T., ``The second us naval observatory ccd astrograph catalog
  (ucac2),'' {\em A.J.}~{\bf 127},  3043--3059 (2004).

\end{thebibliography}
